\begin{exercice*}$\displaystyle \lim_{n\rightarrow +\infty} \dfrac{1-n}{5+n^2}$ est :
     \begin{ChoixQCM}{3}
      \item $0$
      \item $-\infty$
      \item $\dfrac{1}{5}$
      \end{ChoixQCM}

    \begin{corrige}
      \reponseQCM{a}
    \end{corrige}
\end{exercice*}

