 \begin{exercice*}$\displaystyle \lim_{n\rightarrow +\infty} -4n^3+3n^2-6n+\pi$ est :
     \begin{ChoixQCM}{3}
      \item $+\infty$
      \item $-\infty$
      \item $\pi$
      \end{ChoixQCM}

    \begin{corrige}
      \reponseQCM{b}
    \end{corrige}
\end{exercice*}

