\begin{exercice*}$\displaystyle \lim_{n\rightarrow +\infty} 3+\dfrac{5}{n}-\dfrac{7}{n^2}$ est :
      \begin{ChoixQCM}{4}
      \item $0$
      \item $3$
      \item $+\infty$
      \item $-\infty$
      \end{ChoixQCM}

    \begin{corrige}
      \reponseQCM{b}
    \end{corrige}
 \end{exercice*}

