\begin{exercice}
 On considère la fonction $h$, définie sur $\mathbb{R}$ par $h(x)=3(x+2)^2+1$. 
 
 Quel est son sens de variation sur ${\mathcal I}=[-3;-2]$?
\end{exercice}
